-- 2025-05-07 9:50
CREATE TABLE `nexa_net_block` (
                                  `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '主键id',
                                  `date` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                  `height` int(10) NOT NULL DEFAULT '0' COMMENT '高度',
                                  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 AUTO_INCREMENT=1 COLLATE=utf8mb4_bin COMMENT='nexa全网实际报块数表';

CREATE TABLE `grs_net_block` (
                                 `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '主键id',
                                 `date` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                 `height` int(10) NOT NULL DEFAULT '0' COMMENT '高度',
                                 PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 AUTO_INCREMENT=1 COLLATE=utf8mb4_bin COMMENT='grs全网实际报块数表';

CREATE TABLE `mona_net_block` (
                                  `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '主键id',
                                  `date` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                  `height` int(10) NOT NULL DEFAULT '0' COMMENT '高度',
                                  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 AUTO_INCREMENT=1 COLLATE=utf8mb4_bin COMMENT='mona全网实际报块数表';

CREATE TABLE `dgbo_net_block` (
                                  `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '主键id',
                                  `date` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                  `height` int(10) NOT NULL DEFAULT '0' COMMENT '高度',
                                  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 AUTO_INCREMENT=1 COLLATE=utf8mb4_bin COMMENT='dgbo全网实际报块数表';

CREATE TABLE `rxd_net_block` (
                                 `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '主键id',
                                 `date` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                 `height` int(10) NOT NULL DEFAULT '0' COMMENT '高度',
                                 PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 AUTO_INCREMENT=1 COLLATE=utf8mb4_bin COMMENT='rxd全网实际报块数表';

CREATE TABLE `dgbq_net_block` (
                                  `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '主键id',
                                  `date` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                  `height` int(10) NOT NULL DEFAULT '0' COMMENT '高度',
                                  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 AUTO_INCREMENT=1 COLLATE=utf8mb4_bin COMMENT='dgbq全网实际报块数表';
CREATE TABLE `dgbs_net_block` (
                                  `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '主键id',
                                  `date` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                  `height` int(10) NOT NULL DEFAULT '0' COMMENT '高度',
                                  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 AUTO_INCREMENT=1 COLLATE=utf8mb4_bin COMMENT='dgbs全网实际报块数表';
